Title: Abzac cartonnage - Quality checks

Start

[Image: background]

[Image: quality checks]

[Image: quality checks]

Start

Start

[Image: border]

[Image: logo]

[Image: abzac products]

Length

[Image: background]

Quality check 1. Measuring length
a tube or series of tubes is taken and measured using a tape-measure

Choose the correct statement.

- The cut length is measured inside the tubes (correct)
- The cut length is measured outside the tubes

- This is done to make sure there is no variance in length between 15 minutes checks (correct)
- This is done to make sure there is no variance in length between 50 minutes checks

Tube Standards

Next

next

Thickness

[Image: background]

Quality check 2. Measuring thickness
a Vernier caliper is used for measuring thickness of the tubes and turn on a 0 off the tooth

measure by inserting the outside tooth as far into the tube as it goes

Move the 2nd tooth towards it

Choose the correct statement.

- Measure the thickness of the tube using a vernier caliper (correct)
- measure the thickness of the tube using a tape-measure

- turn the off tooth to 0 first (correct)
- start with the outside tooth

Tube Standards

Next

next

Gluing

[Image: background]

Quality check 3. Gluing
Choose the correct statement.

Tube Standards

Next

Next

Documentation

[Image: background]

Quality check 4. Document measurements
Choose the correct statement.

Tube Standards

Again

start