Title: Case Study Timeline

This case study timeline outlines some of the key dates and links to some related resources.
Use the left and right arrows to scroll through the content or click on the boxes on the timeline to see more information.

1978 to 1978: Diana Hartley's Discovery

Diane Hartley was writing her undergraduate architecture thesis about the Citicorp Center in Manhattan, New York when she discovered that wind blowing on the corners of the base of the towers could be a danger. No safety calculations in the plans had considered this risk.

1977 to 1977: CitiCorp Center Built

At the time, it was one of the tallest buildings in the world. It had an unusual sloped roof, but most unusual was the base, which was raised on columns to account for the small area and St. Peter's Lutheran Church at ground level. The columns were , placed at the center of each side because the church was situated at one of the corners.

2022,02,30 to 2022,03,15: Key date 2

Write some info here explaining Key Date 2 in more detail. You can also add a URL to a webpage or video etc here-or a URL link to another module tab.You can also add a small image to the timeline below by using the 'Thumbnail' option under 'Assets'. Here is an example URL link