Title: fitb default

Fill in the blanks.

If you need to use a colon in your answer, copy and paste this character ﹕or this other one ：

Q: When we want to output something in a program, we write the keyword [...] in the flowchart instruction.

Idem with second type of colon : we write the keyword [...] in the flowchart instruction.
A: Output﹕Output; Output：Output
  Hint: this is a hint
  Hint: this is another hint