Title: How to hang a theatrical lighting instrument

Drag the words into the correct boxes

Q: Please put the following items in the correct order when hanging a light.

1. [...]
2. [...]
3. [...]
4. [...]
5. [...]
6. [...]
A: Place C-Clamp on bar with C open towards you; Tighten C-Clamp Bolt to secure + 1/2 Turn; Attach Safety Cable Securely; Open Shutters; Circuit (Plug In) Instrument; Adjust Pan & Tilt of the Instrument (Focus)

Choose the correct statement.