Title: MATERIAL ELIMINACIÓ URINARI CAIMB (còpia)

AMPOLLA FEMENINA, RECOLLIR ORINA PACIENT ENLLITAT

AMPOLLA MASCULINA, RECOLLIR ORINA PACIENT ENLLITAT

ANACLIN 100 ml, RECOLLIDA MOSTRA ORINA

ANACLIN ORINA 24h, RECOLLIDA MOSTRA ORINA

BOLQUER ADULT ADHESIUS, INCONTINÈNCIA ORINA/FECAL

BOLQUER ADULT CALCETA,INCONTINÈNCIA ORINA/FECAL

BOSSA DIÜRESI CAMA AMB AIXETA, RECOL·LECTA ORINA DE SONDA O COL·LECTOR, PACIENT DEMABULANT

BOSSA DIÜRESI AIXETA LLIT, RECOL·LECTA ORINA SONDA O COL·LECTOR, PACIENT ENLLITAT O CADIRA RODES. BOSSA ES BUIDA QUAN ESTÀ PLENA, ES CANVIA /7DIES

BOSSA DIÜRESI TANCADA, RECOL·LECTA ORINA SONDA O COL·LECTOR, PACIENT ENLLITAT O CADIRA RODES.BOSSA ES CANVIA QUAN ESTÀ PLENA

BOSSA MOSTRA ORINA PEDIÀTRICA, RECOLLIDA DIRECTA ORINA EN NENS PETITS QUE NO CONTROLEN ESFÍNTERS

UROCOL·LECTOR MASCULÍ, INCONTINÈNCIA MASCULINA DEGOTEIG CONTINU

ABSORBENT INCONTINÈNCIA LLIT, PROTEGEIX SUPERFÍCIES (LLIT, CADIRA)

BOLQUER ANATÒMIC, INCONTINÈNCIA URINÀRIA

SONDA FOLEY 2 VIES, SONDATGE PERMANENT PACIENT QUE NO POT ELIMINAR

MALLA BOLQUER, SUBJECTAR BOLQUER ANATÒMIC

ORINAL PLA DE LLIT, PACIENT ENLLITAT (ORINA, FEMTES, HIGIENE)

SONDA FEMINA, SONDATGE INTERMITENT DONES

SONDA NELATON, SONDA UNIVERSAL (DIFERENTS VIES)

SONDA TIEMANN, SONDATGE INTERMITENT HOME

TIRES REACTIVES ANÀLISI ORINA, DETERMINAR PARÀMETRES ALTERATS PER A DECIDIR ALTRES PROVES DIAGNÒSTIQUES. DESCARTAR O EVIDENCIAR PATOLOGIES

URIMETER, RECOLLIDA I MESURA DETALLADA DE LA DIÜRESI EN PACIENT SONDAT